{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"SDBNAME","type":"character","width":24},{"name":"NUMBER","type":"number","width":11,"decimals":0},{"name":"TYPE","type":"number","width":11,"decimals":0},{"name":"SIZE","type":"number","width":11,"decimals":0},{"name":"PRODUCER","type":"character","width":8},{"name":"ATTRIBUTE","type":"number","width":11,"decimals":0},{"name":"VERSION","type":"number","width":11,"decimals":0},{"name":"TS1","type":"character","width":6},{"name":"TS2","type":"character","width":6}],"n_rows":6,"rows_kept":6,"cut":false,"deleted_skipped":241,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[247,null,22,20,198,"STEP 7",2,1,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]
[246,null,3,3,118,"STEP 7",2,0,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]
[245,null,2000,2000,942,"STEP 7",2,1,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]
[244,null,122,120,108,"STEP 7",2,0,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]
[243,null,1,1,152,"STEP 7",2,0,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]
[242,null,0,0,170,"STEP 7",2,0,"\u0001âü\u0088\u0019±","\u0004ïm\u0080\u0012,"]