{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":4,"rows_kept":4,"cut":false,"deleted_skipped":1,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[3,1314995,1,1314988,"4AX",224773,"LUST0564.GSD\\PKW Parameterdaten",0,0,3,2100,22,1,4,0,2,"\u0003ç\u0081f\u0018\u0098","\u0003ç\u0081f\u0018\u0098"]
[2,1315030,1,1314988,"LUST CM-DPV1 V1.55",224771,"LUST0564.GSD",0,0,3,2100,22,1,2,0,2,"\u0003çcÊ\u0018\u0098","\u0003çcÊ\u0018\u0098"]
[1,1314988,2,1314971,"LUST CM-DPV1 V1.55",224771,"LUST0564.GSD",0,0,3,2100,22,1,0,0,3,"\u0003çb²\u0018\u0098","\u0003çb²\u0018\u0098"]
[5,1314995,1,1314988,"193",224774,"LUST0564.GSD\\PZD EasyDrive Basic",0,0,3,2100,22,1,5,0,2,"\u0003é\u0098è\u0018\u0098Ç\u0004","\u0003é\u0098è\u0018\u0098Ç\u0004"]